/*SELECT ra, decl FROM Object WHERE qserv_areaspec_box(0.95, 19.171, 1.0, 19.175);*/
SELECT ra, decl FROM Object 
 WHERE decl between 19.171 and 19.175
   and ra between 0.95 and 1.0;
