CREATE TABLE %(tabname)s
  (deepSourceId BIGINT NOT NULL
  ,ra double NOT NULL
  ,decl double NOT NULL
  ,raVar double DEFAULT NULL
  ,declVar double DEFAULT NULL
  ,radeclCov double DEFAULT NULL
  ,chunkId INT NOT NULL
  ,subChunkId INT NOT NULL
  ,u_psfFlux double DEFAULT NULL
  ,u_psfFluxSigma double DEFAULT NULL
  ,u_apFlux double DEFAULT NULL
  ,u_apFluxSigma double DEFAULT NULL
  ,u_modelFlux double DEFAULT NULL
  ,u_modelFluxSigma double DEFAULT NULL
  ,u_instFlux double DEFAULT NULL
  ,u_instFluxSigma double DEFAULT NULL
  ,u_apCorrection double DEFAULT NULL
  ,u_apCorrectionSigma double DEFAULT NULL
  ,u_shapeIx double DEFAULT NULL
  ,u_shapeIy double DEFAULT NULL
  ,u_shapeIxVar double DEFAULT NULL
  ,u_shapeIyVar double DEFAULT NULL
  ,u_shapeIxIyCov double DEFAULT NULL
  ,u_shapeIxx double DEFAULT NULL
  ,u_shapeIyy double DEFAULT NULL
  ,u_shapeIxy double DEFAULT NULL
  ,u_shapeIxxVar double DEFAULT NULL
  ,u_shapeIyyVar double DEFAULT NULL
  ,u_shapeIxyVar double DEFAULT NULL
  ,u_shapeIxxIyyCov double DEFAULT NULL
  ,u_shapeIxxIxyCov double DEFAULT NULL
  ,u_shapeIyyIxyCov double DEFAULT NULL
  ,u_extendedness double DEFAULT NULL
  ,u_flagNegative BOOLEAN DEFAULT NULL
  ,u_flagBadMeasCentroid BOOLEAN DEFAULT NULL
  ,u_flagPixEdge BOOLEAN DEFAULT NULL
  ,u_flagPixInterpAny BOOLEAN DEFAULT NULL
  ,u_flagPixInterpCen BOOLEAN DEFAULT NULL
  ,u_flagPixSaturAny BOOLEAN DEFAULT NULL
  ,u_flagPixSaturCen BOOLEAN DEFAULT NULL
  ,u_flagBadPsfFlux BOOLEAN DEFAULT NULL
  ,u_flagBadApFlux BOOLEAN DEFAULT NULL
  ,u_flagBadModelFlux BOOLEAN DEFAULT NULL
  ,u_flagBadInstFlux BOOLEAN DEFAULT NULL
  ,u_flagBadCentroid BOOLEAN DEFAULT NULL
  ,u_flagBadShape BOOLEAN DEFAULT NULL
  ,g_psfFlux double DEFAULT NULL
  ,g_psfFluxSigma double DEFAULT NULL
  ,g_apFlux double DEFAULT NULL
  ,g_apFluxSigma double DEFAULT NULL
  ,g_modelFlux double DEFAULT NULL
  ,g_modelFluxSigma double DEFAULT NULL
  ,g_instFlux double DEFAULT NULL
  ,g_instFluxSigma double DEFAULT NULL
  ,g_apCorrection double DEFAULT NULL
  ,g_apCorrectionSigma double DEFAULT NULL
  ,g_shapeIx double DEFAULT NULL
  ,g_shapeIy double DEFAULT NULL
  ,g_shapeIxVar double DEFAULT NULL
  ,g_shapeIyVar double DEFAULT NULL
  ,g_shapeIxIyCov double DEFAULT NULL
  ,g_shapeIxx double DEFAULT NULL
  ,g_shapeIyy double DEFAULT NULL
  ,g_shapeIxy double DEFAULT NULL
  ,g_shapeIxxVar double DEFAULT NULL
  ,g_shapeIyyVar double DEFAULT NULL
  ,g_shapeIxyVar double DEFAULT NULL
  ,g_shapeIxxIyyCov double DEFAULT NULL
  ,g_shapeIxxIxyCov double DEFAULT NULL
  ,g_shapeIyyIxyCov double DEFAULT NULL
  ,g_extendedness double DEFAULT NULL
  ,g_flagNegative BOOLEAN DEFAULT NULL
  ,g_flagBadMeasCentroid BOOLEAN DEFAULT NULL
  ,g_flagPixEdge BOOLEAN DEFAULT NULL
  ,g_flagPixInterpAny BOOLEAN DEFAULT NULL
  ,g_flagPixInterpCen BOOLEAN DEFAULT NULL
  ,g_flagPixSaturAny BOOLEAN DEFAULT NULL
  ,g_flagPixSaturCen BOOLEAN DEFAULT NULL
  ,g_flagBadPsfFlux BOOLEAN DEFAULT NULL
  ,g_flagBadApFlux BOOLEAN DEFAULT NULL
  ,g_flagBadModelFlux BOOLEAN DEFAULT NULL
  ,g_flagBadInstFlux BOOLEAN DEFAULT NULL
  ,g_flagBadCentroid BOOLEAN DEFAULT NULL
  ,g_flagBadShape BOOLEAN DEFAULT NULL
  ,r_psfFlux double DEFAULT NULL
  ,r_psfFluxSigma double DEFAULT NULL
  ,r_apFlux double DEFAULT NULL
  ,r_apFluxSigma double DEFAULT NULL
  ,r_modelFlux double DEFAULT NULL
  ,r_modelFluxSigma double DEFAULT NULL
  ,r_instFlux double DEFAULT NULL
  ,r_instFluxSigma double DEFAULT NULL
  ,r_apCorrection double DEFAULT NULL
  ,r_apCorrectionSigma double DEFAULT NULL
  ,r_shapeIx double DEFAULT NULL
  ,r_shapeIy double DEFAULT NULL
  ,r_shapeIxVar double DEFAULT NULL
  ,r_shapeIyVar double DEFAULT NULL
  ,r_shapeIxIyCov double DEFAULT NULL
  ,r_shapeIxx double DEFAULT NULL
  ,r_shapeIyy double DEFAULT NULL
  ,r_shapeIxy double DEFAULT NULL
  ,r_shapeIxxVar double DEFAULT NULL
  ,r_shapeIyyVar double DEFAULT NULL
  ,r_shapeIxyVar double DEFAULT NULL
  ,r_shapeIxxIyyCov double DEFAULT NULL
  ,r_shapeIxxIxyCov double DEFAULT NULL
  ,r_shapeIyyIxyCov double DEFAULT NULL
  ,r_extendedness double DEFAULT NULL
  ,r_flagNegative BOOLEAN DEFAULT NULL
  ,r_flagBadMeasCentroid BOOLEAN DEFAULT NULL
  ,r_flagPixEdge BOOLEAN DEFAULT NULL
  ,r_flagPixInterpAny BOOLEAN DEFAULT NULL
  ,r_flagPixInterpCen BOOLEAN DEFAULT NULL
  ,r_flagPixSaturAny BOOLEAN DEFAULT NULL
  ,r_flagPixSaturCen BOOLEAN DEFAULT NULL
  ,r_flagBadPsfFlux BOOLEAN DEFAULT NULL
  ,r_flagBadApFlux BOOLEAN DEFAULT NULL
  ,r_flagBadModelFlux BOOLEAN DEFAULT NULL
  ,r_flagBadInstFlux BOOLEAN DEFAULT NULL
  ,r_flagBadCentroid BOOLEAN DEFAULT NULL
  ,r_flagBadShape BOOLEAN DEFAULT NULL
  ,i_psfFlux double DEFAULT NULL
  ,i_psfFluxSigma double DEFAULT NULL
  ,i_apFlux double DEFAULT NULL
  ,i_apFluxSigma double DEFAULT NULL
  ,i_modelFlux double DEFAULT NULL
  ,i_modelFluxSigma double DEFAULT NULL
  ,i_instFlux double DEFAULT NULL
  ,i_instFluxSigma double DEFAULT NULL
  ,i_apCorrection double DEFAULT NULL
  ,i_apCorrectionSigma double DEFAULT NULL
  ,i_shapeIx double DEFAULT NULL
  ,i_shapeIy double DEFAULT NULL
  ,i_shapeIxVar double DEFAULT NULL
  ,i_shapeIyVar double DEFAULT NULL
  ,i_shapeIxIyCov double DEFAULT NULL
  ,i_shapeIxx double DEFAULT NULL
  ,i_shapeIyy double DEFAULT NULL
  ,i_shapeIxy double DEFAULT NULL
  ,i_shapeIxxVar double DEFAULT NULL
  ,i_shapeIyyVar double DEFAULT NULL
  ,i_shapeIxyVar double DEFAULT NULL
  ,i_shapeIxxIyyCov double DEFAULT NULL
  ,i_shapeIxxIxyCov double DEFAULT NULL
  ,i_shapeIyyIxyCov double DEFAULT NULL
  ,i_extendedness double DEFAULT NULL
  ,i_flagNegative BOOLEAN DEFAULT NULL
  ,i_flagBadMeasCentroid BOOLEAN DEFAULT NULL
  ,i_flagPixEdge BOOLEAN DEFAULT NULL
  ,i_flagPixInterpAny BOOLEAN DEFAULT NULL
  ,i_flagPixInterpCen BOOLEAN DEFAULT NULL
  ,i_flagPixSaturAny BOOLEAN DEFAULT NULL
  ,i_flagPixSaturCen BOOLEAN DEFAULT NULL
  ,i_flagBadPsfFlux BOOLEAN DEFAULT NULL
  ,i_flagBadApFlux BOOLEAN DEFAULT NULL
  ,i_flagBadModelFlux BOOLEAN DEFAULT NULL
  ,i_flagBadInstFlux BOOLEAN DEFAULT NULL
  ,i_flagBadCentroid BOOLEAN DEFAULT NULL
  ,i_flagBadShape BOOLEAN DEFAULT NULL
  ,z_psfFlux double DEFAULT NULL
  ,z_psfFluxSigma double DEFAULT NULL
  ,z_apFlux double DEFAULT NULL
  ,z_apFluxSigma double DEFAULT NULL
  ,z_modelFlux double DEFAULT NULL
  ,z_modelFluxSigma double DEFAULT NULL
  ,z_instFlux double DEFAULT NULL
  ,z_instFluxSigma double DEFAULT NULL
  ,z_apCorrection double DEFAULT NULL
  ,z_apCorrectionSigma double DEFAULT NULL
  ,z_shapeIx double DEFAULT NULL
  ,z_shapeIy double DEFAULT NULL
  ,z_shapeIxVar double DEFAULT NULL
  ,z_shapeIyVar double DEFAULT NULL
  ,z_shapeIxIyCov double DEFAULT NULL
  ,z_shapeIxx double DEFAULT NULL
  ,z_shapeIyy double DEFAULT NULL
  ,z_shapeIxy double DEFAULT NULL
  ,z_shapeIxxVar double DEFAULT NULL
  ,z_shapeIyyVar double DEFAULT NULL
  ,z_shapeIxyVar double DEFAULT NULL
  ,z_shapeIxxIyyCov double DEFAULT NULL
  ,z_shapeIxxIxyCov double DEFAULT NULL
  ,z_shapeIyyIxyCov double DEFAULT NULL
  ,z_extendedness double DEFAULT NULL
  ,z_flagNegative BOOLEAN DEFAULT NULL
  ,z_flagBadMeasCentroid BOOLEAN DEFAULT NULL
  ,z_flagPixEdge BOOLEAN DEFAULT NULL
  ,z_flagPixInterpAny BOOLEAN DEFAULT NULL
  ,z_flagPixInterpCen BOOLEAN DEFAULT NULL
  ,z_flagPixSaturAny BOOLEAN DEFAULT NULL
  ,z_flagPixSaturCen BOOLEAN DEFAULT NULL
  ,z_flagBadPsfFlux BOOLEAN DEFAULT NULL
  ,z_flagBadApFlux BOOLEAN DEFAULT NULL
  ,z_flagBadModelFlux BOOLEAN DEFAULT NULL
  ,z_flagBadInstFlux BOOLEAN DEFAULT NULL
  ,z_flagBadCentroid BOOLEAN DEFAULT NULL
  ,z_flagBadShape BOOLEAN DEFAULT NULL
  ,y_psfFlux double DEFAULT NULL
  ,y_psfFluxSigma double DEFAULT NULL
  ,y_apFlux double DEFAULT NULL
  ,y_apFluxSigma double DEFAULT NULL
  ,y_modelFlux double DEFAULT NULL
  ,y_modelFluxSigma double DEFAULT NULL
  ,y_instFlux double DEFAULT NULL
  ,y_instFluxSigma double DEFAULT NULL
  ,y_apCorrection double DEFAULT NULL
  ,y_apCorrectionSigma double DEFAULT NULL
  ,y_shapeIx double DEFAULT NULL
  ,y_shapeIy double DEFAULT NULL
  ,y_shapeIxVar double DEFAULT NULL
  ,y_shapeIyVar double DEFAULT NULL
  ,y_shapeIxIyCov double DEFAULT NULL
  ,y_shapeIxx double DEFAULT NULL
  ,y_shapeIyy double DEFAULT NULL
  ,y_shapeIxy double DEFAULT NULL
  ,y_shapeIxxVar double DEFAULT NULL
  ,y_shapeIyyVar double DEFAULT NULL
  ,y_shapeIxyVar double DEFAULT NULL
  ,y_shapeIxxIyyCov double DEFAULT NULL
  ,y_shapeIxxIxyCov double DEFAULT NULL
  ,y_shapeIyyIxyCov double DEFAULT NULL
  ,y_extendedness double DEFAULT NULL
  ,y_flagNegative BOOLEAN DEFAULT NULL
  ,y_flagBadMeasCentroid BOOLEAN DEFAULT NULL
  ,y_flagPixEdge BOOLEAN DEFAULT NULL
  ,y_flagPixInterpAny BOOLEAN DEFAULT NULL
  ,y_flagPixInterpCen BOOLEAN DEFAULT NULL
  ,y_flagPixSaturAny BOOLEAN DEFAULT NULL
  ,y_flagPixSaturCen BOOLEAN DEFAULT NULL
  ,y_flagBadPsfFlux BOOLEAN DEFAULT NULL
  ,y_flagBadApFlux BOOLEAN DEFAULT NULL
  ,y_flagBadModelFlux BOOLEAN DEFAULT NULL
  ,y_flagBadInstFlux BOOLEAN DEFAULT NULL
  ,y_flagBadCentroid BOOLEAN DEFAULT NULL
  ,y_flagBadShape BOOLEAN DEFAULT NULL
  )
;
